\batchmode
\documentclass[11pt,dvips]{article}
\usepackage{epsfig}
\usepackage{fancyheadings}
\setlength{\parskip}{2ex}
%
\hoffset=-55pt
\voffset=-60pt
\textheight=9in
\textwidth=6.5in
\parindent=0pt
\parskip=10pt
\pagestyle{fancy}
\lhead{\bfseries EE 308 Lab 10}
\chead{\bfseries }
\rhead{\bfseries Spring 1996}
\lfoot{\bfseries }
\cfoot{\thepage}
\rfoot{\bfseries }
\setlength{\headrulewidth}{0.5pt}

\makeatother
\newenvironment{tex2html_wrap}{}{}
\newwrite\lthtmlwrite
\def\lthtmltypeout#1{{\let\protect\string\immediate\write\lthtmlwrite{#1}}}%
\newbox\sizebox
\begin{document}
\pagestyle{empty}
{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RH}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline48: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RL}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline50: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RL}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline52: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RH}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline54: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RL}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline56: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RH}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline58: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \begin{displaymath}voltage = {\frac{measurement * (V_{RH} - V_{RL})}{255}} + V_{RL}\end{displaymath}
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RH} = 5$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline62: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RL} = 0$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline64: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \begin{displaymath}\frac{172 * (5 - 0)}{255} + 0 = 3.37 \,\,\,  {\rm volts.}\end{displaymath}
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$10\,{\rm K} \Omega$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline70: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RH}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline72: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$V_{RL}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline74: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage % latex2html id marker 76
\thepage
}

\stepcounter{section}

\end{document}
